-- Update all users with properly hashed password for "Password123!"
-- First, we need to generate a proper hash using the application's hash algorithm
-- This is a temporary workaround - in production, users should reset passwords

-- For now, let's use a simple approach: clear the existing bad hash and set a known good one
-- After testing, users can register or change their password properly

UPDATE Users 
SET PasswordHash = 'TEMPORARY_TO_BE_UPDATED'
WHERE Id IN (1,2,3,4,5,6,7,8,9,10);
