-- This file should undo anything in `up.sql`

-- Down migration is complex and potentially lossy due to new UUID generation.
-- Manual intervention would be required to restore the previous state.
-- This migration is considered irreversible via automated rollback.
SELECT 1; -- Placeholder to indicate successful execution without action
